Eff_0_9

Entries 307674 Mean 0.1715 RMS 0.1397 Underflow 0.9924 Overflow 0.9935

-0.1 -0.05 -0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 Eff vs VPDL : Source - 0 - VPDLsmr Eff_1_9

Entries 163977 Mean 0.1705 RMS 0.1404 Underflow 0.9474 Overflow 0.9855

-0.1 -0.05 -0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 Eff_1_9 Eff vs VPDL : Source - 1 - VPDLsmr Eff_2_9

Entries 28349 Mean 0.1654 RMS 0.1383 Underflow 0.9873 Overflow 0.9773

-0.1 -0.05 -0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0

0.2

0.4

0.6

0.8

1 Eff_2_9 Eff vs VPDL : Source - 2 - VPDLsmr

Eff_all_9

Entries 500000 Mean 0.1709 RMS 0.1401 Underflow 0.9872 Overflow 0.9871

-0.1 -0.05 -0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 Eff vs VPDL : All Events - VPDLsmr