0 0.01 0.02 0.03 0.04 0 200 400 600 800 1000

1200

1400

1600

1800

2000

N(unm) vs ct0(true) (cm) : Source 0^{hNvct0_true_unm_0}_{Entries 154067}

Mean 0.02411 RMS 0.01405 Underflow 0 Overflow 6.605e+04

N(unm) vs ct0(true) (cm) : Source 0

0 0.01 0.02 0.03 0.04 0 200 400 600 800 1000

1200

1400

1600

1800

2000

N(unm) vs lambda(Pt,Lt) - true mix (cm) : Source 0^{hNvlam_true_unm_0}_{Entries 154067}

Mean 0.02411 RMS 0.01405 Underflow 0 Overflow 6.605e+04

N(unm) vs lambda(Pt,Lt) - true mix (cm) : Source 0

0 0.01 0.02 0.03 0.04 0 200 400 600 800 1000

1200

1400

N(unm) vs lambda(Pt,Lt) - smear mix (cm) : Source 0^{hNvlam_tag_unm_0}_{Entries 153683}

Mean 0.02409 RMS 0.01398 Underflow 0 Overflow 6.587e+04

N(unm) vs lambda(Pt,Lt) - smear mix (cm) : Source 0

0 0.01 0.02 0.03 0.04 0 200 400 600 800 1000

1200

1400

1600

N(unm) vs lambda(Pm,Lt) - true mix (cm) : Source 0^{hNvlam_noK_unm_0}_{Entries 154067}

Mean 0.02445 RMS 0.01411 Underflow 0 Overflow 7.518e+04

N(unm) vs lambda(Pm,Lt) - true mix (cm) : Source 0

0 0.01 0.02 0.03 0.04 200

400

600

800

1000

1200

N(unm) vs lambda(Pt,Lm) - true mix (cm) : Source 0^{hNvlam_Lm_unm_0}_{Entries 154067}

Mean 0.02506 RMS 0.01383 Underflow 2310 Overflow 6.833e+04

N(unm) vs lambda(Pt,Lm) - true mix (cm) : Source 0

0 0.01 0.02 0.03 0.04 200 300 400 500 600 700 800 900 N(unm) vs lambda(Pm,Lm,Mdef) - smear mix (cm) : Source 0^{hNvlam_meas_unm_0}_{Entries 153683}

Mean 0.0255 RMS 0.01389 Underflow 2311 Overflow 7.74e+04

N(unm) vs lambda(Pm,Lm,Mdef) - smear mix (cm) : Source 0