0 0.01 0.02 0.03 0.04 0 50 100 150 200 250 300 350 N(all) vs ct0(true) (cm) : Source 0^{hNvct0_true_all_0}_{Entries 49477}

Mean 0.02417 RMS 0.01386 Underflow 0 Overflow 2.116e+04

N(all) vs ct0(true) (cm) : Source 0

0 0.01 0.02 0.03 0.04 0 50 100 150 200 250 300 350 N(all) vs lambda(Pt,Lt) - true mix (cm) : Source 0^{hNvlam_true_all_0}_{Entries 49477}

Mean 0.02417 RMS 0.01386 Underflow 0 Overflow 2.116e+04

N(all) vs lambda(Pt,Lt) - true mix (cm) : Source 0

0 0.01 0.02 0.03 0.04 0 50 100 150 200 250 300 350 N(all) vs lambda(Pt,Lt) - smear mix (cm) : Source 0^{hNvlam_tag_all_0}_{Entries 49477}

Mean 0.02417 RMS 0.01386 Underflow 0 Overflow 2.116e+04

N(all) vs lambda(Pt,Lt) - smear mix (cm) : Source 0

0 0.01 0.02 0.03 0.04 0

50

100

150

200

250

300 N(all) vs lambda(Pm,Lt) - true mix (cm) : Source 0^{hNvlam_noK_all_0}_{Entries 49477}

Mean 0.02465 RMS 0.01404 Underflow 0 Overflow 2.402e+04

N(all) vs lambda(Pm,Lt) - true mix (cm) : Source 0

0 0.01 0.02 0.03 0.04 50

100

150

200

250

300

350 N(all) vs lambda(Pt,Lm) - true mix (cm) : Source 0^{hNvlam_Lm_all_0}_{Entries 49477}

Mean 0.02497 RMS 0.01372 Underflow 556 Overflow 2.172e+04

N(all) vs lambda(Pt,Lm) - true mix (cm) : Source 0

0 0.01 0.02 0.03 0.04 50

100

150

200

250

300 N(all) vs lambda(Pm,Lm,Mdef) - smear mix (cm) : Source 0^{hNvlam_meas_all_0}_{Entries 49477}

Mean 0.02551 RMS 0.01389 Underflow 573 Overflow 2.462e+04

N(all) vs lambda(Pm,Lm,Mdef) - smear mix (cm) : Source 0