0 0.01 0.02 0.03 0.04 0 20 40 60 80 100 120 140 160 180 N(all) vs ct0(true) (cm) : Source 1^{hNvct0_true_all_1}_{Entries 26146}

Mean 0.02464 RMS 0.01386 Underflow 0 Overflow 1.232e+04

N(all) vs ct0(true) (cm) : Source 1

0 0.01 0.02 0.03 0.04 0 20 40 60 80 100 120 140 160 180 N(all) vs lambda(Pt,Lt) - true mix (cm) : Source 1^{hNvlam_true_all_1}_{Entries 26146}

Mean 0.02464 RMS 0.01386 Underflow 0 Overflow 1.232e+04

N(all) vs lambda(Pt,Lt) - true mix (cm) : Source 1

0 0.01 0.02 0.03 0.04 0 20 40 60 80 100 120 140 160 180 N(all) vs lambda(Pt,Lt) - smear mix (cm) : Source 1^{hNvlam_tag_all_1}_{Entries 26146}

Mean 0.02464 RMS 0.01386 Underflow 0 Overflow 1.232e+04

N(all) vs lambda(Pt,Lt) - smear mix (cm) : Source 1

0 0.01 0.02 0.03 0.04 0 20 40 60 80 100 120 140 N(all) vs lambda(Pm,Lt) - true mix (cm) : Source 1^{hNvlam_noK_all_1}_{Entries 26146}

Mean 0.02536 RMS 0.01405 Underflow 0 Overflow 1.533e+04

N(all) vs lambda(Pm,Lt) - true mix (cm) : Source 1

0 0.01 0.02 0.03 0.04 20 40 60 80 100 120 140 160 180 200 N(all) vs lambda(Pt,Lm) - true mix (cm) : Source 1^{hNvlam_Lm_all_1}_{Entries 26146}

Mean 0.02536 RMS 0.01371 Underflow 197 Overflow 1.249e+04

N(all) vs lambda(Pt,Lm) - true mix (cm) : Source 1

0 0.01 0.02 0.03 0.04 20

40

60

80

100

120

140 N(all) vs lambda(Pm,Lm,Mdef) - smear mix (cm) : Source 1^{hNvlam_meas_all_1}_{Entries 26146}

Mean 0.02634 RMS 0.01393 Underflow 221 Overflow 1.57e+04

N(all) vs lambda(Pm,Lm,Mdef) - smear mix (cm) : Source 1