0 0.01 0.02 0.03 0.04 0

500

1000

1500

2000

2500

3000

N(unm) vs ct0(true) (cm) : Source 0^{hNvct0_true_unm_0}_{Entries 246629}

Mean 0.02418 RMS 0.01403 Underflow 0 Overflow 1.06e+05

N(unm) vs ct0(true) (cm) : Source 0

0 0.01 0.02 0.03 0.04 0

500

1000

1500

2000

2500

3000

N(unm) vs lambda(Pt,Lt) - true mix (cm) : Source 0^{hNvlam_true_unm_0}_{Entries 246629}

Mean 0.02418 RMS 0.01403 Underflow 0 Overflow 1.06e+05

N(unm) vs lambda(Pt,Lt) - true mix (cm) : Source 0

0 0.01 0.02 0.03 0.04 0 200 400 600 800 1000

1200

1400

1600

1800

2000

2200

2400

N(unm) vs lambda(Pt,Lt) - smear mix (cm) : Source 0^{hNvlam_tag_unm_0}_{Entries 246075}

Mean 0.02417 RMS 0.01397 Underflow 0 Overflow 1.058e+05

N(unm) vs lambda(Pt,Lt) - smear mix (cm) : Source 0

0 0.01 0.02 0.03 0.04 0

500

1000

1500

2000

2500

N(unm) vs lambda(Pm,Lt) - true mix (cm) : Source 0^{hNvlam_noK_unm_0}_{Entries 246629}

Mean 0.02452 RMS 0.01409 Underflow 0 Overflow 1.207e+05

N(unm) vs lambda(Pm,Lt) - true mix (cm) : Source 0

0 0.01 0.02 0.03 0.04 200 400 600 800 1000

1200

1400

1600

1800

2000

2200

N(unm) vs lambda(Pt,Lm) - true mix (cm) : Source 0^{hNvlam_Lm_unm_0}_{Entries 246629}

Mean 0.02506 RMS 0.01381 Underflow 3104 Overflow 1.086e+05

N(unm) vs lambda(Pt,Lm) - true mix (cm) : Source 0

0 0.01 0.02 0.03 0.04 200

400

600

800

1000

1200

1400

N(unm) vs lambda(Pm,Lm,Mdef) - smear mix (cm) : Source 0^{hNvlam_meas_unm_0}_{Entries 246075}

Mean 0.02547 RMS 0.01387 Underflow 3114 Overflow 1.233e+05

N(unm) vs lambda(Pm,Lm,Mdef) - smear mix (cm) : Source 0