-0.4 -0.2 0 0.2 0.4 -36 10× 0 20 40 60 80 100 120 140 160 180

3 10× Smear - True : Source - 1 - Tag^{hSm_Tr_1_3}_{Entries 262577}

Mean 0 RMS 0 Underflow 1.895e+04 Overflow 5.45e+04

Smear - True : Source - 1 - Tag

-0.1 -0.08 -0.06 -0.04 -0.02 0 0.02 0.04 0.06 0.08 0.1 0

5000

10000

15000

20000

25000

Smear - True : Source - 1 - Lxy^{hSm_Tr_1_5}_{Entries 262577}

Mean 0.0009849 RMS 0.01451 Underflow 0 Overflow 0

Smear - True : Source - 1 - Lxy

-0.1 -0.08 -0.06 -0.04 -0.02 0 0.02 0.04 0.06 0.08 0.1 0 5000

10000

15000

20000

25000

30000

35000

40000

45000

Smear - True : Source - 1 - VPDL^{hSm_Tr_1_8}_{Entries 262577}

Mean 0.0007101 RMS 0.01039 Underflow 37 Overflow 66

Smear - True : Source - 1 - VPDL