Eff_0_9

Entries 493092 Mean 0.1711 RMS 0.14 Underflow 0.9881 Overflow 0.9897

-0.1 -0.05 -0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4

0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 Eff vs VPDL : Source - 0 - VPDLsmr Eff_1_9

Entries 262577 Mean 0.171 RMS 0.1399 Underflow 1 Overflow 0.9871

-0.1 -0.05 -0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4

0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 Eff_1_9 Eff vs VPDL : Source - 1 - VPDLsmr Eff_2_9

Entries 44331 Mean 0.1712 RMS 0.1403 Underflow 0.9859 Overflow 0.964

-0.1 -0.05 -0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4

0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 Eff_2_9 Eff vs VPDL : Source - 2 - VPDLsmr

Eff_all_9

Entries 800000 Mean 0.1708 RMS 0.1401 Underflow 0.9863 Overflow 0.9864

-0.1 -0.05 -0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4

0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 Eff vs VPDL : All Events - VPDLsmr