-0.1 -0.05 -0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0 500 1000

1500

2000

2500

3000

3500

4000

Nunm(Pred) - Src 1 vs VPDL (cm)^{hNunmPred1}_{Entries 150}

Mean 1.709e-05 RMS 0.004471 Underflow 0 Overflow 0

Nunm(Pred) - Src 1 vs VPDL (cm)

-0.1 -0.05 -0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 -1

-0.5

0

0.5

1 Nmix(Data) vs VPDL (cm)^{hNmixData}_{Entries 0}

Mean 0 RMS 0 Underflow 0 Overflow 0

Nmix(Data) vs VPDL (cm)

hNunmPred1

Entries 150 Mean 1.709e-05 RMS 0.004471 Underflow 0 Overflow 0

-0.1 -0.05 -0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 -3 10

-2 10

-1 10 1

10

210

3 10

Nunm(Pred) - Src 1 vs VPDL (cm)^{hNunmPred1}_{Entries 150}

Nunm(Pred) - Src 1 vs VPDL (cm)