Pt jet (GeV)

0 10 20 30 40 50 60 70 80 90 100

Trigger Efficiency

0

0.2

0.4

0.6

0.8

1

Et ( 2,1,1 ) > 10 GeV Et ( TT ) > 4 GeV Et ( TT ) > 6 GeV

Turn-on curves : 2,1,1 algo vs current trigger