_plotEMTTped Entries 85056 Mean -0.5862 RMS 0.6301

ADC counts

-25 -20 -15 -10 -5 0 5 10 15 20 25 0 5000

10000

15000

20000

25000

30000

35000

40000

EM TT values after pedestal subtraction