Pt cut (GeV)

10 20 30 40 50 60

Rate (Hz) (for 5 10**32)

10^2

10^3

10^4

10^5

10^6

10^7

new code, bug in rounding new code, debuggued old code without noise & smearing

Rate vs Pt cut, old vs new code