)^2

(GeV/c ±±HM 80 100 120 140 160 180 200

Cross section (fb)

10

210

LEP excl.

excl. L ±± CDF H excl. R ±± CDF H

-1 D0, L = 1.1 fb Theory(L) Theory(R) Observed Expected band σ1±