[GeV] AM 80 90 100 110 120 130 140 150

β tan

0

20

40

60

80

100

β

0

D0 Run II Preliminary <0) μ (^{-1}

Expected 286 pb >0) μ (^{-1}

Expected 286 pb <0) μ) (^{-1}

286 pb τμ Observed (b >0) μ) (^{-1}

286 pb τμ Observed (b <0) μ) (^{-1}

Observed (bbb 260 pb

LEP 2

max hM