(GeV) γγM 0 50 100 150 200 250 300 350 400 450 500

Events/5 GeV

1

10

210

310

1

data γγ QCD jγ jj *->ee γZ/ signal(M=130GeV)

preliminary -1 DØ, 2.27 fb