m_A (GeV/c^2) tanβ

CDF Run II Preliminary (1.9/fb)

no loop corrections SM-like Higgs, width neglected expected limit 1σ band 2σ band observed limit

95Ψ C.L. upper limits

0 20 40 60 80 100 120 140 160 180 200

100 120 140 160 180 200