invmass627

Entries -118542 Mean 71.85 RMS 24.79 / ndf

2χ 17.94 / 34 Constant 57.4±

455.1 Mean 1.93±

73.18 Sigma 1.11±

11.27

Invariant di-jet mass (GeV)

0 50 100 150 200 250 300 350 400

N/10 GeV

0

100 200

300

400

500 Invariant di-jet mass