invmass121

Entries 19673 Mean 104 RMS 44.4 / ndf

2χ 28.63 / 27 bkg 0.017 ± 1.177

0 50 100 150 200 250 300 350 400 1

10

210

310 ± ±

Invariant di-jet mass