invmass121 Entries 19673 Mean 104 RMS 44.4 Underflow 0 Overflow 26 Integral 1.965e+04 / ndf

2χ 23.11 / 35 Prob 0.9384 bkg 0.0112±

0.9586 signal 0.234± 1.083

0 50 100 150 200 250 300 350 400 0

500

1000

1500

2000

2500

3000

Invariant di-jet mass