(GeV) 01m 50 100 150 200 250 300 350 400 histos_2 Entries -128127 Mean 140.7 RMS 81.36 Underflow 0 Overflow 2.012 / ndf

2χ 22.9 / 23 Constant 26.90±

74.02 Mean 2.44± 76.19 Sigma 2.052±

5.792

-60 -40 -20 0 20 40 60 80 100 histos_2

215 Events