/ ndf

2χ 15.18 / 13 Constant 52.8±

184.3 Mean 3.03±

79.32 Sigma 3.494 ± 8.807

(GeV) 01m 50 100 150 200 250

-100 -50 0 50 100 150 200 250 / ndf ^2χ 15.18 / 13

± Diff Corrected Diff Z->bb MC