dphi10 Entries 33499 Mean 2.991 RMS 0.137

Delta Phi (rad)

2.2 2.3 2.4 2.5 2.6 2.7 2.8 2.9 3 3.1 3.2

N/0.02 rad

10

210

310

Azimuthal angle between leading jets