invmass621 Entries 20544 Mean 99.05 RMS 41.59 Underflow 0

Invariant di-jet mass (GeV)

0 50 100 150 200 250 300 350

N/10 GeV

0 500 1000

1500

2000

2500

3000

3500

Invariant di-jet mass^{invmass621}_{Entries 461}

Mean 75.63 RMS 16.84