invmass627 Entries -70952 Mean 82.63 RMS 61.52 Underflow 0 Overflow 17.59 Integral 609.8 / ndf

2χ 19.58 / 34 Prob 0.9772 Constant 42.7± 203 Mean 3.14± 70.58 Sigma 1.50± 10.63

Invariant di-jet mass (GeV)

0 50 100 150 200 250 300 350 400

N/10 GeV

-50 0 50 100 150 200 250 Invariant di-jet mass