invmass627 Entries -70952 Mean 73.51 RMS 22.44 Underflow 0 Overflow -5.712 Integral 794.2 / ndf

2χ 12.75 / 34 Prob 0.9997 Constant 41.5± 257.2 Mean 2.27± 74.55 Sigma 1.40± 11.06

Invariant di-jet mass (GeV)

0 50 100 150 200 250 300 350 400

N/10 GeV

-50 0 50 100 150 200 250 300 Invariant di-jet mass