invmass627 Entries -85030 Mean 85.05 RMS 25.72 / ndf

2χ 27.42 / 28 Prob 0.4957 Constant 47.7± 454.8 Mean 1.65± 76.29 Sigma 1.21± 13.32

Invariant di-jet mass (GeV)

0 50 100 150 200 250 300 350

N/10 GeV

0

100

200

300

400

500 Invariant di-jet mass