invmass627 Entries -8341 Mean 106.8 RMS 51.77 / ndf

2χ 19.64 / 28 Prob 0.8773 Constant 15.01±

29.82 Mean 8.39±

84.01 Sigma 7.0± 17.7

Invariant di-jet mass (GeV)

0 50 100 150 200 250 300 350

N/10 GeV

-20 -10 0 10 20 30 40 50 60 Invariant di-jet mass