invmass627 Entries -130984 Mean 67.98 RMS 39.91 Underflow 0 Overflow -12.24 Integral 1354 / ndf

2χ 32.7 / 28 Prob 0.2469 Constant 38.0±

365.5 Mean 1.69±

78.53 Sigma 1.21±

15.16

0 50 100 150 200 250 300 350 0

100

200

300

400 Invariant di-jet mass