histos_2 Entries 9287618 Mean 100.7 RMS 58.19 Underflow 0 Overflow 0.9575 / ndf

2χ 6.911 / 9 Constant 38.06±

97.09 Mean 2.24±

85.78 Sigma 3.19± 5.79

(GeV) 01m 50 100 150 200 250 300

-50

0

50

100

150 histos_2