histos_2 Entries 1.346015e+07 Mean 103.6 RMS 49.17 Underflow 0 Overflow 2.562 / ndf

2χ 9.75 / 9 Constant 42.2±

226.3 Mean 2.23±

81.02 Sigma 2.09± 10.73

(GeV) 01m 50 100 150 200 250 300

-100 -50 0 50 100 150 200 250 300 histos_2