histos_2 Entries 1.000617e+07 Mean 98.55 RMS 52.74 Underflow 0 Overflow 0.04016 / ndf

2χ 4.848 / 9 Constant 35.9±

239.3 Mean 2.00±

68.28 Sigma 1.97± 11.88

(GeV) 01m 50 100 150 200 250 300

-100 -50 0 50 100 150 200 250 300 350 histos_2