histos_2 Entries 9129788 Mean 105.5 RMS 50.1 Underflow 0 Overflow 1.359 / ndf

2χ 10.44 / 9 Constant 52.4±

184 Mean 3.00±

79.31 Sigma 3.450± 8.795

(GeV) 01m 50 100 150 200 250 300

-100 -50 0 50 100 150 200 250 histos_2