histos_2 Entries 9441615 Mean 108.3 RMS 51.72 Underflow 0 Overflow 1.427 / ndf

2χ 11.57 / 9 Constant 54.4±

169.8 Mean 3.05±

79.22 Sigma 3.343± 7.617

(GeV) 01m 50 100 150 200 250 300

-100 -50 0 50 100 150 200