histos_2 Entries 2008428 Mean 120.1 RMS 65.66 Underflow 0 Overflow 1.342 / ndf

2χ 5.651 / 9 Constant 10.3±

34.8 Mean 5.61±

66.93 Sigma 4.40± 13.38

(GeV) 01m 50 100 150 200 250 300 -20

0

20

40

60