histos_2 Entries 3460347 Mean 106.6 RMS 52.63 Underflow 0 Overflow 1.118 / ndf

2χ 15.52 / 9 Constant 32.38± 91.35 Mean 2.62± 77.75 Sigma 2.000± 6.064

(GeV) 01m 50 100 150 200 250 300

-100

-50

0

50

100

150^{histos_2}