histos_2 Entries 7044336 Mean 101 RMS 55.26 Underflow 0 Overflow 0.04177 / ndf

2χ 5.693 / 9 Constant 30.7±

180.5 Mean 2.23±

68.61 Sigma 2.28± 12.01

(GeV) 01m 50 100 150 200 250 300 -50 0 50 100 150 200 250