histos_2 Entries 2807245 Mean 107.2 RMS 61.57 Underflow 0 Overflow 0.0166 / ndf

2χ 3.797 / 9 Constant 26.60±

77.12 Mean 4.1±

65.4 Sigma 5.68± 11.56

(GeV) 01m 50 100 150 200 250 300 -60 -40 -20 0 20 40 60 80 100 120 140 histos_2