GenGamma

fEnergy fXPos fYPos fZ fx1 fx2 fEnergyMin fXTilt fYTilt fXWidth fYWidth fEproton fEelectron fRadXmean fRadXmin fEdist fydist fxdist fzdist fBethe fydistgaus fxdistgaus

EnergyFracLoss GenGamma

GetEnergyMin GetXTilt GetYTilt GetEProton GetEElectron GetEDist GetYDist GetXDist GetZDist SetEnergyMin SetXTilt SetYTilt SetXWidth SetYWidth

SetEProton SetEElectron SetRadXMean SetRadXMin SetEdist SetYDist SetXDist SetZDist GetXsec GetEnergy GetXPos GetYPos GetZ GetX1 GetX2