LumiFast

fBdl fysep fyoffset fxoffset fnxstrips fnystrips_up fnystrips_dn fxmax fzmagnet fzspectro fIsScattering fIsEnergyLoss fEwindowMin fEwindowMax fEnergy_res fPos_res fEscale_up fEscale_dn fEnergy_e fEnergy_p fxpos_gam fypos_gam fEnergy_up fEnergy_dn fypos_up fxpos_up fypos_dn fxpos_dn fThetaDist fGenerator fGenInternal

Eres abs LumiFast

GetYMinUp GetYMaxUp GetYMinDn GetYMaxDn GetXMax GetXMin GetYOffset GetXOffset GetBdl GetZMagnet GetZSpectro GetBeta SetBeta GetERes GetPosRes GetEScaleUp GetEScaleDn GetEnergyTrueUp GetEnergyTrueDn GetEnergyGamTrue GetXPosGamTrue GetYPosGamTrue GetZTrue GetEnergyUp GetEnergyDn GetYPosUp GetXPosUp

GetYPosDn GetXPosDn GetZ GetXPosGam GetYPosGam GetEnergyGam GetEWindowMin GetEWindowMax GetGenerator GetThetaDist SetBdl SetEScaleUp SetEScaleDn SetEWindowMin SetEWindowMax SetEWindow SetScattering SetEnergyLoss SetPosRes SetEnergyRes SetYOffset SetXOffset SetNyStripsUp SetNyStripsDn SetGenerator NewEvent ProcessEvent IsCoincidence IsHitUp