signalDeltaZDistr Entries 19 Mean 174.3 RMS 823 Underflow 0 Overflow 0

[mm] DCA z -500 0 500 1000 1500 2000 2500 3000 3500

Entries/2 mm

0.0 0.2 0.4 0.6 0.8 1.0 1.2 1.4 1.6 1.8 2.0