signalEtaDistr

Entries 19 Mean -0.08604 RMS 1.905 Underflow 0 Overflow 0

Eta -2.5 -2.0 -1.5 -1.0 -0.5 0.0 0.5 1.0 1.5 2.0 2.5

Entries

0.0 0.2 0.4 0.6 0.8 1.0 1.2 1.4 1.6 1.8 2.0