jetTemplate_rebinned

Entries 4176 Mean -0.3358 RMS 103.6 Underflow 32.75 Overflow 31.88

[mm] DCA z -600 -400 -200 0 200 400 600

Entries/25 mm

0 50 100 150 200 250 300