signalTimeDistr Entries 19 Mean 0.02861 RMS 0.3314 Underflow 0 Overflow 0

Time [ns]

-5 -4 -3 -2 -1 0 1 2 3 4 5

Entries/100 ps

0 1 2 3 4 5 6 7