Time [ns]

-1.0 -0.5 0.0 0.5 1.0

[mm] DCA z

-500

-400

-300

-200

-100 0 100 200 300 signalTimeVsDZ Entries 19 Mean x 0.02778 Mean y -17.78 RMS x 0.3441 RMS y 129.3 0 1 0 0 18 0 0 0 0