signalTimeDistr Entries 70 Mean 0.05948 RMS 0.2992 Underflow 0 Overflow 0

Time [ns]

-5 -4 -3 -2 -1 0 1 2 3 4 5

Entries/100 ps

0 2 4 6 8 10 12 14 16^{signalTimeDistr}Entries 70