Time [ns]

-1.0 -0.5 0.0 0.5 1.0

[mm] DCA z

-400

-200 0 200 400 600 800 signalTimeVsDZ Entries 70 Mean x 0.06286 Mean y -9.429 RMS x 0.2981 RMS y 110.1 0 0 0 0 70 0 0 0 0