deltaZ20Met50_rebinned

Entries 10564 Mean 1.581 RMS 66.94 Underflow 6.375 Overflow 7.75

[mm] DCA z -600 -400 -200 0 200 400 600

Entries/2 mm

0

500

1000

1500

2000

2500