deltaZ50Met75_rebinned

Entries 915 Mean 0.3404 RMS 70.09 Underflow 0.375 Overflow 0.5

[mm] DCA z -600 -400 -200 0 200 400 600

Entries/2 mm

0 20 40 60 80 100 120 140 160 180 200 220 240^{deltaZ50Met75_rebinned}Entries 915