jetTemplateHiMu Entries 3956 Mean -1.503 RMS 148.5 Underflow 0 Overflow 0

[mm] DCA z -2000-1500-1000 -500 0 500 1000 1500 2000

Entries/2mm

0 20 40 60 80 100 120^{jetTemplateHiMu}