jetTemplateHiMu_rebinned

Entries 3956 Mean 1.161 RMS 67.07 Underflow 3.75 Overflow 2.625

[mm] DCA z -600 -400 -200 0 200 400 600

Entries/2mm

0 100 200 300 400 500 600 700 800 900