jetTemplateLowMu_rebinned

Entries 5728 Mean 3.474 RMS 66.95 Underflow 3.5 Overflow 3.375

[mm] DCA z -600 -400 -200 0 200 400 600

Entries/2mm

0 200 400 600 800 1000

1200

1400